Zonal Wavenumber [cycles/km]

Meridional Wavenumber [cycles/km]

Unambiguous 2-D spectrum

-0.10 -0.05 0.00 +0.05 +0.10

-0.10

-0.05

0.00

+0.05

+0.10

-2 -1 0 1 2 3 4

g:\data\airglow_halley\2001\Jul20-21\ Files na_0058 => na_0157 For the 150 km field-of-view corrz: -0.19841 +/- 0.039734 corrm: -0.0013739 +/- 0.039112

1

2 30

210

60

240

90

270

120

300

150

330

180 0

Phi Spectrum

0.2 0.4 30

210

60

240

90

270

120

300

150

330

180 0

Correlation Coefficient vs Phi