Zonal Wavenumber [cycles/km] M er id io na lW av en um be r [c yc le s/ km ] Unambiguous 2-D spectrum

-0.10 -0.05 0.00 +0.05 +0.10

-0.10

-0.05

0.00

+0.05

+0.10

-3 -2 -1 0 1 2 3

g:\data\airglow_rothera\2004\Mar16-17\ Files oh_0031 => oh_0068 For the 150 km field-of-view corrz: -0.15597 +/- 0.024516 corrm: -0.1236 +/- 0.038277

0.5

1

30

210

60

240

90

270

120

300

150

330

180 0

Phi Spectrum

0.2

0.4 30

210

60

240

90

270

120

300

150

330

180 0

Correlation Coefficient vs Phi